Genes Human(F) BACends Contigs

Other 0kb 25kb 50kb 75kb 100kb 125kb 150kb 175kb 200kb 225kb7 2 0 1 7 9 1 8 2 1 ( 2 2 ) 1 4 8 2 3 (26) 13 12 4(15) 11 (16)(6) 5 25 (10) (19) (24)^{2 5 7 D 1 4 . RR P C I - 2 4 - 2 3 9 D 2 2 . R 4 3 3 P 1 4 . FRPCI-24-80D1.F 217E2.F232H18.R2 5 3 J 1 3 . R 1 4 2 L 1 1 . F 113O3.R395K14.F 1 0 3 P 1 7 . F92L3.R RPCI-24-157D24.R274L11.F309C11.F151E3.R 192E22.R13J10.R 92D1.RRPCI-24-76D15.R 443P20.F 216C2.R458J15.F 1 4 9 H 2 0 . R88A22.R 2 5 7 D 1 4 . F435C12.RRPCI-24-120F19.R 2 3 2 H 1 8 . FRPCI-24-121O8.F RPCI-24-239D22.F c-KitRw inversion (distal breakpoint)}