BACends Genes Contigs 0kb 25kb 50kb 75kb 100kb 125kb 150kb 175kb 200kb_{( 2 1 ) 8 1 7 1 8 1 9 (20) (6) (23) 22 12 (16)}R P C I - 2 4 - 1 6 5 K 1 2 . F R P C I - 2 4 - 6 5 M 2 2 . FRPCI-24-65K22.F_{112K7.F}RPCI-24-165B22.F_{4 0 4 G 1 1 . R}6 9 M 1 7 . F^{3 3 3 C 2 1 . F}_{2 0 4 A 8 . R}^{127F9.R}_{RPCI-24-61D11.R}217F12.F129C13.F_{334C16.F} RPCI-24-63C22.RRPCI-24-134G11.R_{1 7 8 N 7 . F}^{391D11.R}_{3 4 G 8 . R}69M17.R310F19.R^{RPCI-24-165K12.R} 333C21.R^{RPCI-24-165B22.R}_{461N17.F}^{260C1.R384G4.R}_{2 2 6 M 1 3 . F4 1 8 J 1 3 . R 4 1 5 O 9 . F}^{87E20.R}_{127F9.F}RPCI-24-112D6.R_{53L1.FR P C I - 2 4 - 2 2 2 J 5 . F}^{TXK TECtypeI}